X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1d20b7f2c632245f4803e1e6c4b622de8ff9064d..6d0f32ddb8e1aec3b8707db31ed244758c242672:/docs/latex/wx/dynlib.tex

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index 6c64a245ea..967416a24c 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -16,12 +16,6 @@ wxDynamicLibrary is a class representing dynamically loadable library
 this class to load a library and don't worry about unloading it -- it will be
 done in the objects destructor automatically.
 
-% deprecated now...
-%
-%\wxheading{See also}
-%
-%\helpref{wxDllLoader}{wxdllloader}
-
 \wxheading{Derived from}
 
 No base class.
@@ -30,6 +24,10 @@ No base class.
 
 <wx/dynlib.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 (only available if \texttt{wxUSE\_DYNLIB\_CLASS} is set to $1$)
 
 \latexignore{\rtfignore{\wxheading{Members}}}
@@ -169,6 +167,8 @@ be a combination of the following bits:
 \twocolitem{wxDL\_VERBATIM}{don't try to append the appropriate extension to
 the library name (this is done by default).}
 \twocolitem{wxDL\_DEFAULT}{default flags, same as wxDL\_NOW currently}
+\twocolitem{wxDL\_QUIET}{don't log an error message if the library couldn't be
+loaded.}
 \end{twocollist}
 
 Returns \true if the library was successfully loaded, \false otherwise.
@@ -206,6 +206,10 @@ No base class.
 
 <wx/dynlib.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 (only available if \texttt{wxUSE\_DYNLIB\_CLASS} is set to $1$)
 
 \latexignore{\rtfignore{\wxheading{Members}}}
