X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1c6c52fdefbee79857043cabd7e7e2f768bb09ad..03cf4aa61da039f4331bfc788cc07850a50a0df5:/docs/latex/wx/varhvscrollhelper.tex?ds=inline

diff --git a/docs/latex/wx/varhvscrollhelper.tex b/docs/latex/wx/varhvscrollhelper.tex
index 21b0f1eb4d..2f19bd43a0 100644
--- a/docs/latex/wx/varhvscrollhelper.tex
+++ b/docs/latex/wx/varhvscrollhelper.tex
@@ -39,6 +39,10 @@ rather than from here directly.
 
 <wx/vscroll.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxHScrolledWindow}{wxhscrolledwindow},
