X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1c0c339c2d391168461dece5e97571f5f12a5026..ec85956ae93cdbbb4351a5b34e595ea56f296fc4:/docs/latex/wx/boxsizer.tex

diff --git a/docs/latex/wx/boxsizer.tex b/docs/latex/wx/boxsizer.tex
index 239eb9d0a1..279896593d 100644
--- a/docs/latex/wx/boxsizer.tex
+++ b/docs/latex/wx/boxsizer.tex
@@ -10,6 +10,10 @@ For more information, please see \helpref{Programming with wxBoxSizer}{boxsizerp
 \helpref{wxSizer}{wxsizer}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/sizer.h>
+
 \wxheading{See also}
 
 \helpref{wxSizer}{wxsizer}, \helpref{Sizer overview}{sizeroverview}
@@ -26,7 +30,7 @@ or wxHORIZONTAL for creating either a column sizer or a row sizer.
 \func{void}{RecalcSizes}{\void}
 
 Implements the calculation of a box sizer's dimensions and then sets
-the size of its its children (calling \helpref{wxWindow::SetSize}{wxwindowsetsize} 
+the size of its children (calling \helpref{wxWindow::SetSize}{wxwindowsetsize} 
 if the child is a window). It is used internally only and must not be called
 by the user. Documented for information.
 
