X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1c0c339c2d391168461dece5e97571f5f12a5026..e4861c72be058dd9d7e12cb77127d0be523414c8:/docs/latex/wx/flexsizr.tex

diff --git a/docs/latex/wx/flexsizr.tex b/docs/latex/wx/flexsizr.tex
index d7456bbc21..28b3c3c95f 100644
--- a/docs/latex/wx/flexsizr.tex
+++ b/docs/latex/wx/flexsizr.tex
@@ -1,3 +1,14 @@
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+%% Name:        flexsizr.tex
+%% Purpose:     wxFlexGridSizer
+%% Author:      wxWidgets Team
+%% Modified by:
+%% Created:
+%% RCS-ID:      $Id$
+%% Copyright:   (c) wxWidgets Team
+%% License:     wxWindows license
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+
 \section{\class{wxFlexGridSizer}}\label{wxflexgridsizer}
 
 A flex grid sizer is a sizer which lays out its children in a two-dimensional
@@ -6,16 +17,31 @@ height and all fields in one column having the same width, but all
 rows or all columns are not necessarily the same height or width as in
 the \helpref{wxGridSizer}{wxgridsizer}.
 
+Since wxWidgets 2.5.0, wxFlexGridSizer can also size items equally in one
+direction but unequally ("flexibly") in the other. If the sizer is only
+flexible in one direction (this can be changed using
+\helpref{SetFlexibleDirection}{wxflexgridsizersetflexibledirection}),
+it needs to be decided how the sizer should grow in the other ("non flexible")
+direction in order to fill the available space. The
+\helpref{SetNonFlexibleGrowMode}{wxflexgridsizersetnonflexiblegrowmode} method
+serves this purpose.
+
 \wxheading{Derived from}
 
 \helpref{wxGridSizer}{wxgridsizer}\\
 \helpref{wxSizer}{wxsizer}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/sizer.h>
+
 \wxheading{See also}
 
 \helpref{wxSizer}{wxsizer}, \helpref{Sizer overview}{sizeroverview}
 
+\latexignore{\rtfignore{\wxheading{Members}}}
+
 \membersection{wxFlexGridSizer::wxFlexGridSizer}\label{wxflexgridsizerwxflexgridsizer}
 
 \func{}{wxFlexGridSizer}{\param{int }{rows}, \param{int }{cols}, \param{int }{vgap}, \param{int }{hgap}}
@@ -31,27 +57,112 @@ all children.
 
 \membersection{wxFlexGridSizer::AddGrowableCol}\label{wxflexgridsizeraddgrowablecol}
 
-\func{void}{AddGrowableCol}{\param{size\_t }{idx}}
+\func{void}{AddGrowableCol}{\param{size\_t }{idx}, \param{int }{proportion = $0$}}
 
-Specifies that column idx (starting from zero) should be grown if
+Specifies that column {\it idx} (starting from zero) should be grown if
 there is extra space available to the sizer.
 
+The {\it proportion} parameter has the same meaning as the stretch factor for
+the \helpref{sizers}{sizeroverview} except that if all proportions are $0$,
+then all columns are resized equally (instead of not being resized at all).
+
 \membersection{wxFlexGridSizer::AddGrowableRow}\label{wxflexgridsizeraddgrowablerow}
 
-\func{void}{AddGrowableRow}{\param{size\_t }{idx}}
+\func{void}{AddGrowableRow}{\param{size\_t }{idx}, \param{int }{proportion = $0$}}
 
 Specifies that row idx (starting from zero) should be grown if there
 is extra space available to the sizer.
 
+See \helpref{AddGrowableCol}{wxflexgridsizeraddgrowablecol} for the description
+of {\it proportion} parameter.
+
+\membersection{wxFlexGridSizer::GetFlexibleDirection}\label{wxflexgridsizergetflexibledrection}
+
+\constfunc{int}{GetFlexibleDirection}{\void}
+
+Returns a wxOrientation value that specifies whether the sizer flexibly
+resizes its columns, rows, or both (default).
+
+\wxheading{Return value}
+
+One of the following values:
+
+\begin{twocollist}
+\twocolitem{wxVERTICAL}{Rows are flexibly sized.}
+\twocolitem{wxHORIZONTAL}{Columns are flexibly sized.}
+\twocolitem{wxBOTH}{Both rows and columns are flexibly sized (this is the default value).}
+\end{twocollist}
+
+\wxheading{See also}
+
+\helpref{SetFlexibleDirection}{wxflexgridsizersetflexibledirection}
+
+
+\membersection{wxFlexGridSizer::GetNonFlexibleGrowMode}\label{wxflexgridsizergetnonflexiblegrowmode}
+
+\constfunc{int}{GetNonFlexibleGrowMode}{\void}
+
+Returns the value that specifies how the sizer grows in the "non flexible"
+direction if there is one.
+
+\wxheading{Return value}
+
+One of the following values:
+
+\begin{twocollist}
+\twocolitem{wxFLEX\_GROWMODE\_NONE}{Sizer doesn't grow in the non flexible direction.}
+\twocolitem{wxFLEX\_GROWMODE\_SPECIFIED}{Sizer honors growable columns/rows set with
+\helpref{AddGrowableCol}{wxflexgridsizeraddgrowablecol} and
+\helpref{AddGrowableRow}{wxflexgridsizeraddgrowablerow}.
+In this case equal sizing applies to minimum sizes of columns or
+rows (this is the default value).}
+\twocolitem{wxFLEX\_GROWMODE\_ALL}{Sizer equally stretches all columns or rows
+in the non flexible direction, whether they are growable or not in the flexible
+direction.}
+\end{twocollist}
+
+\wxheading{See also}
+
+\helpref{SetFlexibleDirection}{wxflexgridsizersetflexibledirection},
+\helpref{SetNonFlexibleGrowMode}{wxflexgridsizersetnonflexiblegrowmode}
+
+
 \membersection{wxFlexGridSizer::RemoveGrowableCol}\label{wxflexgridsizerremovegrowablecol}
 
 \func{void}{RemoveGrowableCol}{\param{size\_t }{idx}}
 
 Specifies that column idx is no longer growable.
 
+
 \membersection{wxFlexGridSizer::RemoveGrowableRow}\label{wxflexgridsizerremovegrowablerow}
 
 \func{void}{RemoveGrowableRow}{\param{size\_t }{idx}}
 
 Specifies that row idx is no longer growable.
 
+
+\membersection{wxFlexGridSizer::SetFlexibleDirection}\label{wxflexgridsizersetflexibledirection}
+
+\func{void}{SetFlexibleDirection}{\param{int }{direction}}
+
+Specifies whether the sizer should flexibly resize its columns, rows, or
+both. Argument {\tt direction} can be {\tt wxVERTICAL}, {\tt wxHORIZONTAL}
+or {\tt wxBOTH} (which is the default value). Any other value is ignored. See
+\helpref{GetFlexibleDirection()}{wxflexgridsizergetflexibledrection} for the
+explanation of these values.
+
+Note that this method does not trigger relayout.
+
+
+\membersection{wxFlexGridSizer::SetNonFlexibleGrowMode}\label{wxflexgridsizersetnonflexiblegrowmode}
+
+\func{void}{SetNonFlexibleGrowMode}{\param{wxFlexSizerGrowMode }{mode}}
+
+Specifies how the sizer should grow in the non flexible direction if
+there is one (so
+\helpref{SetFlexibleDirection()}{wxflexgridsizersetflexibledirection} must have
+been called previously). Argument {\it mode} can be one of those documented in
+\helpref{GetNonFlexibleGrowMode}{wxflexgridsizergetnonflexiblegrowmode}, please
+see there for their explanation.
+
+Note that this method does not trigger relayout.
