X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1b113a811d9b29afb89ea5a4e192c187906f3b9b..7946d7deaac081a745dc616a5eb13ae864865fa2:/docs/latex/wx/htwindow.tex

diff --git a/docs/latex/wx/htwindow.tex b/docs/latex/wx/htwindow.tex
index a763720138..e386da35f9 100644
--- a/docs/latex/wx/htwindow.tex
+++ b/docs/latex/wx/htwindow.tex
@@ -127,7 +127,7 @@ Moves to next page in history.
 
 \membersection{wxHtmlWindow::LoadPage}\label{wxhtmlwindowloadpage}
 
-\func{bool}{LoadPage}{\param{const wxString\& }{location}}
+\func{virtual bool}{LoadPage}{\param{const wxString\& }{location}}
 
 Unlike SetPage this function first loads HTML page from {\it location} 
 and then displays it. See example:
