X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1acd7ba6f2ffc10369ed74a2ac4d8a28eadf1151..12a44087e448071f9f108208a0a88e908d543d44:/docs/latex/wx/minifram.tex

diff --git a/docs/latex/wx/minifram.tex b/docs/latex/wx/minifram.tex
index c749a749eb..db8cd206b4 100644
--- a/docs/latex/wx/minifram.tex
+++ b/docs/latex/wx/minifram.tex
@@ -36,7 +36,7 @@ See also \helpref{window styles overview}{windowstyles}.
 
 \wxheading{Remarks}
 
-This class has miniframe functionality only under Windows. On other platforms,
+This class has miniframe functionality under Windows and GTK+. On other platforms,
 it behaves like a normal frame.
 
 \wxheading{See also}
