X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/184686f6562c480cc129fb0cab8d229d10068c99..e31f4da5f0e888e3bae947061be02a427c570372:/docs/latex/wx/scrolwin.tex

diff --git a/docs/latex/wx/scrolwin.tex b/docs/latex/wx/scrolwin.tex
index dd1273f9ce..8a93020529 100644
--- a/docs/latex/wx/scrolwin.tex
+++ b/docs/latex/wx/scrolwin.tex
@@ -19,7 +19,7 @@ calling either \helpref{wxWindow::SetVirtualSize}{wxwindowsetvirtualsize},
 or \helpref{wxWindow::FitInside}{wxwindowfitinside}, and setting the
 scrolling increments for it by calling 
 \helpref{wxScrolledWindow::SetScrollRate}{wxscrolledwindowsetscrollrate}.
-Scrolling in some orientation is enabled by setting a non zero increment
+Scrolling in some orientation is enabled by setting a non-zero increment
 for it.
 
 The most automatic and newest way is to simply let sizers determine the
@@ -207,7 +207,7 @@ for details.
 
 \membersection{wxScrolledWindow::EnableScrolling}\label{wxscrolledwindowenablescrolling}
 
-\func{void}{EnableScrolling}{\param{const bool}{ xScrolling}, \param{const bool}{ yScrolling}}
+\func{void}{EnableScrolling}{\param{bool}{ xScrolling}, \param{bool}{ yScrolling}}
 
 Enable or disable physical scrolling in the given direction. Physical
 scrolling is the physical transfer of bits up or down the
