X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/181b406894cd3ed082a1beb015811fbd12e8d371..146ba0feacf1222ec8a45dfd69dae77b063bf2cf:/docs/latex/wx/dllload.tex

diff --git a/docs/latex/wx/dllload.tex b/docs/latex/wx/dllload.tex
index 36b14e6ad7..cacac58090 100644
--- a/docs/latex/wx/dllload.tex
+++ b/docs/latex/wx/dllload.tex
@@ -24,7 +24,7 @@ The terms {\it DLL} and {\it shared library/object} will both be used in the
 documentation to refer to the same thing: a {\tt .dll} file under Windows or 
 {\tt .so} or {\tt .sl} one under Unix.
 
-Example of using this class to dynamically load {\tt strlen()} function:
+Example of using this class to dynamically load the {\tt strlen()} function:
 
 \begin{verbatim}
 #if defined(__WXMSW__)
@@ -145,47 +145,3 @@ FALSE; may also be {\tt NULL}.}
 This function unloads the shared library. The handle {\it dllhandle} must have
 been returned by \helpref{LoadLibrary}{wxdllloaderloadlibrary} previously.
 
-\section{\class{wxDynamicLibrary}}\label{wxdynamiclibrary}
-
-wxDynamicLibrary is a class representing dynamically loadable library
-(Windows DLL, shared library under Unix etc.). It is implemented as a wrapper
-to \helpref{wxDllLoader}{wxdllloader}.
-
-\wxheading{See also}
-
-\helpref{wxDllLoader}{wxdllloader}
-
-\membersection{wxDynamicLibrary::wxDynamicLibrary}\label{wxdynamiclibrarywxdynamiclibrary}
-
-\func{}{wxDynamicLibrary}{\void}
-
-\func{}{wxDynamicLibrary}{\param{const wxString\& }{name}}
-
-Constructor. Second form calls \helpref{Load}{wxdynamiclibraryload}.
-
-\membersection{wxDynamicLibrary::IsLoaded}\label{wxdynamiclibraryisloaded}
-
-\constfunc{bool}{IsLoaded}{\void}
-
-Returns TRUE if the library was successfully loaded, FALSE otherwise.
-
-\membersection{wxDynamicLibrary::Load}\label{wxdynamiclibraryload}
-
-\func{bool}{Load}{\param{const wxString\& }{name}}
-
-Loads DLL into memory.
-
-Returns TRUE if the library was successfully loaded, FALSE otherwise.
-
-\membersection{wxDynamicLibrary::Unload}\label{wxdynamiclibraryunload}
-
-\func{void}{Unload}{\void}
-
-Unloads the library from memory.
-
-\membersection{wxDynamicLibrary::GetSymbol}\label{wxdynamiclibrarygetsymbol}
-
-\constfunc{void*}{GetSymbol}{\param{const wxString\& }{name}}
-
-Returns pointer to symbol {\it name} in the library or NULL if the library
-contains no such symbol.
