X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/175fd114d329e9cfc247942f998a3ffd2c9829c2..9bf6a1b80cb856903e15387ebecc926142e73010:/docs/latex/wx/minifram.tex

diff --git a/docs/latex/wx/minifram.tex b/docs/latex/wx/minifram.tex
index ac6cd8d9a2..94be6ca012 100644
--- a/docs/latex/wx/minifram.tex
+++ b/docs/latex/wx/minifram.tex
@@ -3,9 +3,13 @@
 A miniframe is a frame with a small title bar. It is suitable for floating toolbars that must not
 take up too much screen area.
 
+An example of mini frame can be seen in the \helpref{dialogs sample}{sampledialogs} 
+using the ``Mini frame'' command of the ``Generic dialogs'' submenu.
+
 \wxheading{Derived from}
 
 \helpref{wxFrame}{wxframe}\\
+\helpref{wxTopLevelWindow}{wxtoplevelwindow}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
@@ -14,6 +18,10 @@ take up too much screen area.
 
 <wx/minifram.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
