X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/169948a05ff0707ecddc12f9e26d2a0a994fa0ae..bdd1a35ddc2523d4d6359fb31653b36c70c442d4:/docs/latex/wx/dynlib.tex

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index c9da6923b0..59ef7f8a82 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -6,7 +6,7 @@
 %% Created:     14.01.02 (extracted from dllload.tex)
 %% RCS-ID:      $Id$
 %% Copyright:   (c) Vadim Zeitlin
-%% License:     wxWindows license
+%% License:     wxWidgets license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxDynamicLibrary}}\label{wxdynamiclibrary}
@@ -23,6 +23,7 @@ done in the objects destructor automatically.
 %\helpref{wxDllLoader}{wxdllloader}
 
 
+
 \membersection{wxDynamicLibrary::wxDynamicLibrary}\label{wxdynamiclibrarywxdynamiclibrary}
 
 \func{}{wxDynamicLibrary}{\void}
@@ -34,13 +35,14 @@ Constructor. Second form calls \helpref{Load}{wxdynamiclibraryload}.
 
 \membersection{wxDynamicLibrary::CanonicalizeName}\label{wxdynamiclibrarycanonicalizename}
 
-\func{wxString}{CanonicalizeName}{\param{const wxString\& }{name}, \param{wxDynamicLibraryCategory cat = wxDL\_LIBRARY}}
+\func{wxString}{CanonicalizeName}{\param{const wxString\& }{name}, \param{wxDynamicLibraryCategory}{ cat = wxDL\_LIBRARY}}
 
 Returns the platform-specific full name for the library called \arg{name}. E.g.
 it adds a {\tt ".dll"} extension under Windows and {\tt "lib"} prefix and 
 {\tt ".so"}, {\tt ".sl"} or maybe {\tt ".dylib"} extension under Unix.
 
 The possible values for \arg{cat} are:
+
 \begin{twocollist}
     \twocolitem{wxDL\_LIBRARY}{normal library}
     \twocolitem{wxDL\_MODULE}{a loadable module or plugin}
@@ -51,17 +53,19 @@ The possible values for \arg{cat} are:
 \helpref{CanonicalizePluginName}{wxdynamiclibrarycanonicalizepluginname}
 
 
+
 \membersection{wxDynamicLibrary::CanonicalizePluginName}\label{wxdynamiclibrarycanonicalizepluginname}
 
-\func{wxString}{CanonicalizePluginName}{\param{const wxString\& }{name}, \param{wxPluginCategory cat = wxDL\_PLUGIN\_GUI}}
+\func{wxString}{CanonicalizePluginName}{\param{const wxString\& }{name}, \param{wxPluginCategory}{ cat = wxDL\_PLUGIN\_GUI}}
 
 This function does the same thing as 
-\helpref{CanonicalizeName}{wxdynamiclibrarycanonicalizename} but for wxWindows
+\helpref{CanonicalizeName}{wxdynamiclibrarycanonicalizename} but for wxWidgets
 plugins. The only difference is that compiler and version information are added
 to the name to ensure that the plugin which is going to be loaded will be
 compatible with the main program.
 
 The possible values for \arg{cat} are:
+
 \begin{twocollist}
     \twocolitem{wxDL\_PLUGIN\_GUI}{plugin which uses GUI classes (default)}
     \twocolitem{wxDL\_PLUGIN\_BASE}{plugin which only uses wxBase}
@@ -79,7 +83,7 @@ responsability to do this using \helpref{Unload}{wxdynamiclibraryunload}.
 
 \membersection{wxDynamicLibrary::GetSymbol}\label{wxdynamiclibrarygetsymbol}
 
-\constfunc{void*}{GetSymbol}{\param{const wxString\& }{name}}
+\constfunc{void *}{GetSymbol}{\param{const wxString\& }{name}}
 
 Returns pointer to symbol {\it name} in the library or NULL if the library
 contains no such symbol.
@@ -89,6 +93,17 @@ contains no such symbol.
 \helpref{wxDYNLIB\_FUNCTION}{wxdynlibfunction}
 
 
+\membersection{wxDynamicLibrary::HasSymbol}\label{wxdynamiclibraryhassymbol}
+
+\constfunc{bool}{HasSymbol}{\param{const wxString\& }{name}}
+
+Returns \true if the symbol with the given \arg{name} is present in the dynamic
+library, \false otherwise. Unlike \helpref{GetSymbol}{wxdynamiclibrarygetsymbol},
+this function doesn't log an error message if the symbol is not found.
+
+\newsince{2.5.4}
+
+
 \membersection{wxDynamicLibrary::IsLoaded}\label{wxdynamiclibraryisloaded}
 
 \constfunc{bool}{IsLoaded}{\void}
@@ -102,6 +117,7 @@ Returns \true if the library was successfully loaded, \false otherwise.
 
 Loads DLL with the given \arg{name} into memory. The \arg{flags} argument can
 be a combination of the following bits:
+
 \begin{twocollist}
 \twocolitem{wxDL\_LAZY}{equivalent of RTLD\_LAZY under Unix, ignored elsewhere}
 \twocolitem{wxDL\_NOW}{equivalent of RTLD\_NOW under Unix, ignored elsewhere}
@@ -112,10 +128,6 @@ the library name (this is done by default).}
 
 Returns \true if the library was successfully loaded, \false otherwise.
 
-\wxheading{See also}
-
-\helpref{}{}
-
 
 \membersection{wxDynamicLibrary::Unload}\label{wxdynamiclibraryunload}
 
