X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/15d83f726c215b06f2fdd15ece40d66d2f16a01d..6aaee6afdcde7c9e677f642303d4988a66cb9dc9:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 0eb65bf927..f191f0d251 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -18,6 +18,10 @@ be variable length according to the size of the window.
 
 <wx/statusbr.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
@@ -45,7 +49,7 @@ from an {\bf OnSize} event handler.
 
 Default constructor.
 
-\func{}{wxStatusBar}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
+\func{}{wxStatusBar}{\param{wxWindow* }{parent}, \param{wxWindowID }{id = wxID\_ANY},\rtfsp
 \param{long}{ style = wxST\_SIZEGRIP},\rtfsp
 \param{const wxString\& }{name = ``statusBar"}}
 
@@ -75,7 +79,7 @@ Destructor.
 
 \membersection{wxStatusBar::Create}\label{wxstatusbarcreate}
 
-\func{bool}{Create}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
+\func{bool}{Create}{\param{wxWindow* }{parent}, \param{wxWindowID }{id = wxID\_ANY},\rtfsp
 \param{long}{ style = wxST\_SIZEGRIP},\rtfsp
 \param{const wxString\& }{name = ``statusBar"}}
 
@@ -198,12 +202,12 @@ Sets the text for one field.
 Sets the widths of the fields in the status line. There are two types of
 fields: fixed widths one and variable width fields. For the fixed width fields
 you should specify their (constant) width in pixels. For the variable width
-fields, specify a negative number which indicates how should the field expand:
+fields, specify a negative number which indicates how the field should expand:
 the space left for all variable width fields is divided between them according
 to the absolute value of this number. A variable width field with width of $-2$
 gets twice as much of it as a field with width $-1$ and so on.
 
-For example, to create one fixed width field of width $50$ in the right part of
+For example, to create one fixed width field of width $100$ in the right part of
 the status bar and two more fields which get $66$\% and $33$\% of the remaining
 space correspondingly, you should use an array containing $-2$, $-1$ and $100$.
 
@@ -215,7 +219,7 @@ time it was called.}
 
 \docparam{widths}{Contains an array of {\it n} integers, each of which is
 either an absolute status field width in pixels if positive or indicates a
-variable width field if negative}
+variable width field if negative.}
 
 \wxheading{Remarks}
 
