X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/15d83f726c215b06f2fdd15ece40d66d2f16a01d..3cc305b2b4a0674c56c84d7088cfd70676b850f0:/docs/latex/wx/statbox.tex

diff --git a/docs/latex/wx/statbox.tex b/docs/latex/wx/statbox.tex
index 3c5612b9e2..5ab26f8a5a 100644
--- a/docs/latex/wx/statbox.tex
+++ b/docs/latex/wx/statbox.tex
@@ -24,6 +24,10 @@ correct Z-Order of controls.
 
 <wx/statbox.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 There are no special styles for this control.
