X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/15d83f726c215b06f2fdd15ece40d66d2f16a01d..3affcd078b1dc6d92cd06f18b5cc4c41a33161ea:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 0eb65bf927..261d762315 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -198,12 +198,12 @@ Sets the text for one field.
 Sets the widths of the fields in the status line. There are two types of
 fields: fixed widths one and variable width fields. For the fixed width fields
 you should specify their (constant) width in pixels. For the variable width
-fields, specify a negative number which indicates how should the field expand:
+fields, specify a negative number which indicates how the field should expand:
 the space left for all variable width fields is divided between them according
 to the absolute value of this number. A variable width field with width of $-2$
 gets twice as much of it as a field with width $-1$ and so on.
 
-For example, to create one fixed width field of width $50$ in the right part of
+For example, to create one fixed width field of width $100$ in the right part of
 the status bar and two more fields which get $66$\% and $33$\% of the remaining
 space correspondingly, you should use an array containing $-2$, $-1$ and $100$.
 
@@ -215,7 +215,7 @@ time it was called.}
 
 \docparam{widths}{Contains an array of {\it n} integers, each of which is
 either an absolute status field width in pixels if positive or indicates a
-variable width field if negative}
+variable width field if negative.}
 
 \wxheading{Remarks}
 
