X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/15d83f726c215b06f2fdd15ece40d66d2f16a01d..13220cca727ed74c2998b4fb89a4d80aacf28e68:/docs/latex/wx/txtstrm.tex

diff --git a/docs/latex/wx/txtstrm.tex b/docs/latex/wx/txtstrm.tex
index c739fe4529..12fcca5070 100644
--- a/docs/latex/wx/txtstrm.tex
+++ b/docs/latex/wx/txtstrm.tex
@@ -122,9 +122,9 @@ Reads a 32 bit signed integer from the stream.
 See \helpref{wxTextInputStream::Read8}{wxtextinputstreamread8} for the
 description of the {\it base} parameter.
 
-\membersection{wxTextInputStream::ReadChar}\label{wxtextinputstreamreadchar}
+\membersection{wxTextInputStream::GetChar}\label{wxtextinputstreamgetchar}
 
-\func{wxChar}{wxTextInputStream::ReadChar}{\void}
+\func{wxChar}{wxTextInputStream::GetChar}{\void}
 
 Reads a character, returns $0$ if there are no more characters in the stream.
 
