X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/15d83f726c215b06f2fdd15ece40d66d2f16a01d..054004b96ddf67f9478676951931f33f075c86d3:/docs/latex/wx/stream.tex

diff --git a/docs/latex/wx/stream.tex b/docs/latex/wx/stream.tex
index 6d94bdeca1..c48821a94f 100644
--- a/docs/latex/wx/stream.tex
+++ b/docs/latex/wx/stream.tex
@@ -257,7 +257,7 @@ Sets the current position (in bytes) in the stream buffer.
 \wxheading{Warning}
 
 Since it is a very low-level function, there is no check on the position:
-specifing an invalid position can induce unexpected results.
+specifying an invalid position can induce unexpected results.
 
 \membersection{wxStreamBuffer::GetLastAccess}\label{wxstreambuffergetlastaccess}
 
