X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/15d83f726c215b06f2fdd15ece40d66d2f16a01d..038c03337f139d64f99d3334edfd1aa08354d9f0:/docs/latex/wx/stopwtch.tex?ds=inline

diff --git a/docs/latex/wx/stopwtch.tex b/docs/latex/wx/stopwtch.tex
index f80cf86175..1f756a493f 100644
--- a/docs/latex/wx/stopwtch.tex
+++ b/docs/latex/wx/stopwtch.tex
@@ -17,11 +17,15 @@ use it to measure the time elapsed by some function:
 
 \wxheading{Include files}
 
-<wx/timer.h>
+<wx/stopwatch.h>
+
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
 
 \wxheading{See also}
 
-\helpref{::wxStartTimer}{wxstarttimer}, \helpref{::wxGetElapsedTime}{wxgetelapsedtime}, \helpref{wxTimer}{wxtimer}
+\helpref{wxTimer}{wxtimer}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
