X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/154b6b0f0eda0007d7ffbbfacff7e57c5861c28b..c699b4583b6047191ac326728654c6fe8920aa7b:/docs/latex/wx/wizpage.tex

diff --git a/docs/latex/wx/wizpage.tex b/docs/latex/wx/wizpage.tex
index 1b6812c26b..da03d7e81c 100644
--- a/docs/latex/wx/wizpage.tex
+++ b/docs/latex/wx/wizpage.tex
@@ -42,6 +42,10 @@ should be very rarely needed.
 
 <wx/wizard.h>
 
+\wxheading{Library}
+
+\helpref{wxAdv}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxWizard}{wxwizard}, \helpref{wxWizard sample}{samplewizard}
@@ -50,7 +54,7 @@ should be very rarely needed.
 
 \membersection{wxWizardPage::wxWizardPage}\label{wxwizardpagewxwizardpage}
 
-\func{}{wxWizardPage}{\param{wxWizard* }{parent}, \param{const wxBitmap\& }{bitmap = wxNullBitmap}, \param{const wxChar }{*resource = NULL}}
+\func{}{wxWizardPage}{\param{wxWizard* }{parent}, \param{const wxBitmap\& }{bitmap = wxNullBitmap}}
 
 Constructor accepts an optional bitmap which will be used for this page
 instead of the default one for this wizard (note that all bitmaps used should
@@ -63,7 +67,6 @@ wizard will resize and reposition the page anyhow.
 
 \docparam{bitmap}{The page-specific bitmap if different from the global one}
 
-\docparam{resource}{Load the page from the specified resource if non-NULL}
 
 \membersection{wxWizardPage::GetPrev}\label{wxwizardpagegetprev}
 
@@ -130,6 +133,10 @@ instead.
 
 <wx/wizard.h>
 
+\wxheading{Library}
+
+\helpref{wxAdv}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxWizard}{wxwizard}, \helpref{wxWizard sample}{samplewizard}
