X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/154b6b0f0eda0007d7ffbbfacff7e57c5861c28b..aaa6f9ba6bd0be1fe6a34800e6f753ffdc49900c:/docs/latex/wx/window.tex

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index 4c15ed1719..25d5cea9c4 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -2380,7 +2380,7 @@ handler is supposed to be there).
 
 Reparents the window, i.e the window will be removed from its
 current parent window (e.g. a non-standard toolbar in a wxFrame)
-and then re-inserted into another. Available on Windows and GTK.
+and then re-inserted into another.
 
 \wxheading{Parameters}
 
