X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/154b6b0f0eda0007d7ffbbfacff7e57c5861c28b..58f1fdc926e4fc0f0b8ca49384d72e51bea2e86b:/docs/latex/wx/notebook.tex

diff --git a/docs/latex/wx/notebook.tex b/docs/latex/wx/notebook.tex
index 82e7e3f24e..b7ca119732 100644
--- a/docs/latex/wx/notebook.tex
+++ b/docs/latex/wx/notebook.tex
@@ -287,6 +287,7 @@ inside the tab is returned as well.
 \twocolitem{{\bf wxNB\_HITTEST\_ONICON}}{The point was over an icon (currently wxMSW only).}
 \twocolitem{{\bf wxNB\_HITTEST\_ONLABEL}}{The point was over a label (currently wxMSW only).}
 \twocolitem{{\bf wxNB\_HITTEST\_ONITEM}}{The point was over an item, but not on the label or icon.}
+\twocolitem{{\bf wxNB\_HITTEST\_ONPAGE}}{The point was over a currently selected page, not over any tab. Note that this flag is present only if {\tt wxNOT\_FOUND} is returned.}
 \end{twocollist}
 }
 
