X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/154b6b0f0eda0007d7ffbbfacff7e57c5861c28b..1e9693318372b3321c400fc7a1746bbcd696eceb:/docs/latex/wx/wizpage.tex

diff --git a/docs/latex/wx/wizpage.tex b/docs/latex/wx/wizpage.tex
index 1b6812c26b..3e4ddf1b0d 100644
--- a/docs/latex/wx/wizpage.tex
+++ b/docs/latex/wx/wizpage.tex
@@ -50,7 +50,7 @@ should be very rarely needed.
 
 \membersection{wxWizardPage::wxWizardPage}\label{wxwizardpagewxwizardpage}
 
-\func{}{wxWizardPage}{\param{wxWizard* }{parent}, \param{const wxBitmap\& }{bitmap = wxNullBitmap}, \param{const wxChar }{*resource = NULL}}
+\func{}{wxWizardPage}{\param{wxWizard* }{parent}, \param{const wxBitmap\& }{bitmap = wxNullBitmap}}
 
 Constructor accepts an optional bitmap which will be used for this page
 instead of the default one for this wizard (note that all bitmaps used should
@@ -63,7 +63,6 @@ wizard will resize and reposition the page anyhow.
 
 \docparam{bitmap}{The page-specific bitmap if different from the global one}
 
-\docparam{resource}{Load the page from the specified resource if non-NULL}
 
 \membersection{wxWizardPage::GetPrev}\label{wxwizardpagegetprev}
 
