X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1542ea396a625766c59d683adbb1d613c1344d50..abbc257086d3661a2343fae05579057951f2650c:/docs/latex/wx/frame.tex

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index 6cbe7276e0..c42b8db335 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -56,6 +56,8 @@ you should use
 {\tt wxDEFAULT\_FRAME\_STYLE \& (wxMINIMIZE\_BOX | wxMAXIMIZE\_BOX)} for the
 frames having this style (the dialogs don't have minimize nor maximize box by
 default)}
+\twocolitem{\windowstyle{wxFRAME\_SHAPED}}{Windows with this style are
+  allowed to have their shape changed with the \helpref{SetShape}{wxframesetshape} method.}
 \end{twocollist}
 
 The default frame style is for normal, resizeable frames. To create a frame
@@ -510,10 +512,10 @@ menu bar and its menus will be destroyed also, so do not delete the menu
 bar explicitly (except by resetting the frame's menu bar to another
 frame or NULL).
 
-Under Windows, a call to \helpref{wxFrame::OnSize}{wxframeonsize} is generated, so be sure to initialize
+Under Windows, a size event is generated, so be sure to initialize
 data members properly before calling {\bf SetMenuBar}.
 
-Note that it is not possible to call this function twice for the same frame object.
+Note that on some platforms, it is not possible to call this function twice for the same frame object.
 
 \wxheading{See also}
 
@@ -521,7 +523,7 @@ Note that it is not possible to call this function twice for the same frame obje
 
 \membersection{wxFrame::SetShape}\label{wxframesetshape}
 
-\func{bool}{SetShape}{\param{const wxRegion&}{ region}}
+\func{bool}{SetShape}{\param{const wxRegion\&}{ region}}
 
 If the platform supports it, sets the shape of the window to that
 depicted by \it{region}.  The system will not display or
