X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/152e99d73f694df6b195ac7a865ada34b057af5f..3cc305b2b4a0674c56c84d7088cfd70676b850f0:/docs/latex/wx/sysopt.tex

diff --git a/docs/latex/wx/sysopt.tex b/docs/latex/wx/sysopt.tex
index cd945711a4..7078bd6fa5 100644
--- a/docs/latex/wx/sysopt.tex
+++ b/docs/latex/wx/sysopt.tex
@@ -31,6 +31,26 @@ Setting this to 0 causes more flicker, but allows applications to paint graphics
 \twocolitem{msw.display.directdraw}{If set to 1, use DirectDraw-based implementation of
 \helpref{wxDisplay}{wxdisplay}. By default the standard Win32 functions are
 used.}
+\twocolitem{msw.font.no-proof-quality}{If set to 1, use default fonts quality
+instead of proof quality when creating fonts. With proof quality the fonts
+have slightly better appearance but not all fonts are available in this
+quality, e.g. the Terminal font in small sizes is not and this option may be
+used if wider fonts selection is more important than higher quality.}
+\end{twocollist}
+
+\wxheading{GTK}
+
+\twocolwidtha{7cm}
+\begin{twocollist}\itemsep=0pt
+\twocolitem{{\bf Option}}{{\bf Value}}
+\twocolitem{gtk.tlw.can-set-transparent}{\helpref{wxTopLevelWindow::CanSetTransparent()}{wxtoplevelwindowcansettransparent} 
+method normally tries to detect automatically whether transparency for top
+level windows is currently supported, however this may sometimes fail and this
+option allows to override the automatic detection. Setting it to $1$ makes the
+transparency be always available (setting it can still fail, of course) and
+setting it to $0$ makes it always unavailable.}
+\twocolitem{gtk.desktop}{This option can be set to override the default desktop
+environment determination. Supported values are \texttt{GNOME} and \texttt{KDE}.}
 \end{twocollist}
 
 \wxheading{Mac}
