X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/14d63513822a9a91697508ecd37f95bac8af662e..c11420034872e991007a53f351fc24e49cc0519e:/docs/latex/wx/function.tex?ds=inline

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index 5ab7cee273..b3230a5d8e 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -1962,6 +1962,8 @@ See also \helpref{wxIsBusy}{wxisbusy}, \helpref{wxBusyCursor}{wxbusycursor}.
 
 Ring the system bell.
 
+Note that this function is categorized as a GUI one and so is not thread-safe.
+
 \wxheading{Include files}
 
 <wx/utils.h>
@@ -2856,6 +2858,11 @@ The clipboard must have previously been opened for this call to succeed.
 \param{wxBase64DecodeMode }{mode = wxBase64DecodeMode\_Strict},\\
 \param{size\_t }{*posErr = \NULL}}
 
+\func{wxMemoryBuffer}{wxBase64Decode}{\\
+\param{const wxString\& }{src},\\
+\param{wxBase64DecodeMode }{mode = wxBase64DecodeMode\_Strict},\\
+\param{size\_t }{*posErr = \NULL}}
+
 These function decode a Base64-encoded string. The first version is a raw
 decoding function and decodes the data into the provided buffer \arg{dst} of
 the given size \arg{dstLen}. An error is returned if the buffer is not large
@@ -2878,7 +2885,8 @@ necessary buffer size.}
 \docparam{dstLen}{The size of the output buffer, ignored if \arg{dst} is
 \NULL.}
 
-\docparam{src}{The input string, must not be \NULL.}
+\docparam{src}{The input string, must not be \NULL. For the version using
+wxString, the input string should contain only ASCII characters.}
 
 \docparam{srcLen}{The length of the input string or special value
 \texttt{wxNO\_LEN} if the string is \NUL-terminated and the length should be
@@ -3364,7 +3372,7 @@ Returns the mouse position in screen coordinates.
 
 Returns the current state of the mouse.  Returns a wxMouseState
 instance that contains the current position of the mouse pointer in
-screen coordinants, as well as boolean values indicating the up/down
+screen coordinates, as well as boolean values indicating the up/down
 status of the mouse buttons and the modifier keys.
 
 \wxheading{Include files}
@@ -3419,8 +3427,8 @@ Returns label that should be used for given {\it id} element.
 \docparam{id}{given id of the \helpref{wxMenuItem}{wxmenuitem}, \helpref{wxButton}{wxbutton}, \helpref{wxToolBar}{wxtoolbar} tool, etc.}
 
 \docparam{withCodes}{if false then strip accelerator code from the label;
-usefull for getting labels without accelerator char code like for toolbar tooltip or
-under platforms without traditional keyboard like smartphones}
+useful for getting labels without accelerator char code like for toolbar tooltip or
+on platforms without traditional keyboard like smartphones}
 
 \docparam{accelerator}{optional accelerator string automatically added to label; useful
 for building labels for \helpref{wxMenuItem}{wxmenuitem}}
