X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/14b4c0ff125b7bd175916f465e76a359b4fda706..aad035b2f51cc206edc0b888695dfb5c8d53687a:/docs/latex/wx/splitter.tex?ds=sidebyside

diff --git a/docs/latex/wx/splitter.tex b/docs/latex/wx/splitter.tex
index 164877e8a2..6f18e23181 100644
--- a/docs/latex/wx/splitter.tex
+++ b/docs/latex/wx/splitter.tex
@@ -114,7 +114,7 @@ Destroys the wxSplitterWindow and its children.
 
 \membersection{wxSplitterWindow::Create}\label{wxsplitterwindowcreate}
 
-\func{bool}{Create}{\param{wxWindow*}{ parent}, \param{wxWindowID}{ id}, \param{int }{x},\rtfsp
+\func{bool}{Create}{\param{wxWindow*}{ parent}, \param{wxWindowID}{ id}, \rtfsp
 \param{const wxPoint\& }{point = wxDefaultPosition}, \param{const wxSize\& }{size = wxDefaultSize},\rtfsp
 \param{long }{style=wxSP\_3D}, \param{const wxString\&}{ name = "splitterWindow"}}
 
@@ -178,7 +178,8 @@ Returns the right/bottom pane.
 
 \func{void}{Initialize}{\param{wxWindow* }{window}}
 
-Initializes the splitter window to have one pane.
+Initializes the splitter window to have one pane.  The child window is
+shown if it is currently hidden.
 
 \wxheading{Parameters}
 
@@ -296,12 +297,12 @@ Gravity tells wxSplitterWindow how much will left/top window grow while resizing
 
 Example values:
 \begin{itemize}\itemsep=0pt
-\item{ 0.0  - only the bottom/right window is automaticaly resized}
+\item{ 0.0  - only the bottom/right window is automatically resized}
 \item{ 0.5  - both windows grow by equal size}
 \item{ 1.0  - only left/top window grows}
 \end{itemize}
 
-Gravity should be real value betwwen 0.0 and 1.0.
+Gravity should be a real value between 0.0 and 1.0.
 
 Default value of sash gravity is 0.0. That value is compatible with previous 
 (before gravity was introduced) behaviour of wxSplitterWindow.
@@ -330,6 +331,15 @@ Does not currently check for an out-of-range value.
 
 \helpref{wxSplitterWindow::GetSashPosition}{wxsplitterwindowgetsashposition}
 
+\membersection{wxSplitterWindow::SetSashSize}\label{wxsplitterwindowsetsashsize}
+
+\func{void}{SetSashSize}{\param{int }{size}}
+
+Sets the sash size. Normally, the sash size is determined according to the metrics
+of each platform, but the application can override this, for example to show
+a thin sash that the user is not expected to drag. If {\it size} is more -1,
+the custom sash size will be used.
+
 \membersection{wxSplitterWindow::SetMinimumPaneSize}\label{wxsplitterwindowsetminimumpanesize}
 
 \func{void}{SetMinimumPaneSize}{\param{int }{paneSize}}
@@ -376,7 +386,8 @@ Only sets the internal variable; does not update the display.
 \func{bool}{SplitHorizontally}{\param{wxWindow* }{window1}, \param{wxWindow* }{window2},
  \param{int}{ sashPosition = 0}}
 
-Initializes the top and bottom panes of the splitter window.
+Initializes the top and bottom panes of the splitter window.  The
+child windows are shown if they are currently hidden.
 
 \wxheading{Parameters}
 
@@ -385,7 +396,7 @@ Initializes the top and bottom panes of the splitter window.
 \docparam{window2}{The bottom pane.}
 
 \docparam{sashPosition}{The initial position of the sash. If this value is
-positive, it specifies the size of the upper pane. If it is negative, it is
+positive, it specifies the size of the upper pane. If it is negative, its
 absolute value gives the size of the lower pane. Finally, specify 0 (default)
 to choose the default position (half of the total window height).}
 
@@ -409,7 +420,8 @@ window is not currently split using \helpref{IsSplit}{wxsplitterwindowissplit}.
 \func{bool}{SplitVertically}{\param{wxWindow* }{window1}, \param{wxWindow* }{window2},
  \param{int}{ sashPosition = 0}}
 
-Initializes the left and right panes of the splitter window.
+Initializes the left and right panes of the splitter window.  The
+child windows are shown if they are currently hidden.
 
 \wxheading{Parameters}
 
