X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/14a31d6774453a45662280c5de9240e9ab965896..bc9fa1f694dc8e1894dbb3ce2165ae27dac8b4b3:/docs/latex/wx/statline.tex

diff --git a/docs/latex/wx/statline.tex b/docs/latex/wx/statline.tex
index 93f62a82ae..3fe2b22681 100644
--- a/docs/latex/wx/statline.tex
+++ b/docs/latex/wx/statline.tex
@@ -72,7 +72,7 @@ for further details.
 
 \constfunc{bool}{IsVertical}{\void}
 
-Returns TRUE if the line is vertical, FALSE if horizontal.
+Returns true if the line is vertical, false if horizontal.
 
 \membersection{wxStaticLine::GetDefaultSize}\label{wxstaticlinegetdefaultsize}
 
