X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/13b555259270512e01b20631c60468327fd08ba7..81c882b613b5d99ddb1e5ab69fcd7ebccc287025:/docs/latex/wx/mbconv.tex

diff --git a/docs/latex/wx/mbconv.tex b/docs/latex/wx/mbconv.tex
index 0a968d4179..22d7e99345 100644
--- a/docs/latex/wx/mbconv.tex
+++ b/docs/latex/wx/mbconv.tex
@@ -273,3 +273,4 @@ The number of characters written to \arg{dst} (or the number of characters
 which would have been written to it if it were non-\NULL) on success or 
 \texttt{wxCONV\_FAILED} on error.
 
+
