X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/13b555259270512e01b20631c60468327fd08ba7..134198f1b773199b5506c302bf9510831d0319f5:/docs/latex/wx/mbconv.tex

diff --git a/docs/latex/wx/mbconv.tex b/docs/latex/wx/mbconv.tex
index 0a968d4179..dd419ed0e9 100644
--- a/docs/latex/wx/mbconv.tex
+++ b/docs/latex/wx/mbconv.tex
@@ -61,6 +61,10 @@ No base class
 
 <wx/strconv.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxCSConv}{wxcsconv}, 
@@ -273,3 +277,4 @@ The number of characters written to \arg{dst} (or the number of characters
 which would have been written to it if it were non-\NULL) on success or 
 \texttt{wxCONV\_FAILED} on error.
 
+
