X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/136edc27f94c43426efeb5a714f649a7c7d3ae04..a9249b2eb2a40d8c71f828669045c4ddaa8dc5ff:/docs/latex/wx/gridsizr.tex

diff --git a/docs/latex/wx/gridsizr.tex b/docs/latex/wx/gridsizr.tex
index 9beba7fd69..82a70ec5b6 100644
--- a/docs/latex/wx/gridsizr.tex
+++ b/docs/latex/wx/gridsizr.tex
@@ -12,7 +12,7 @@ the height of each field is the height of the tallest child.
 
 \membersection{wxGridSizer::wxGridSizer}\label{wxgridsizerwxgridsizer}
 
-\func{}{wxGridSizer}{\param{int }{cols}, \param{int }{rows}, \param{int }{vgap}, \param{int }{hgap}}
+\func{}{wxGridSizer}{\param{int }{rows}, \param{int }{cols}, \param{int }{vgap}, \param{int }{hgap}}
 
 \func{}{wxGridSizer}{\param{int }{cols}, \param{int }{vgap = 0}, \param{int }{hgap = 0}}
 
@@ -22,3 +22,62 @@ calculated to form the total number of children in the sizer, thus making the
 sizer grow dynamically. {\it vgap} and {\it hgap} define extra space between
 all children.
 
+
+\membersection{wxGridSizer::GetCols}\label{wxgridsizergetcols}
+
+\func{int}{GetCols}{}
+
+Returns the number of columns in the sizer.
+
+
+\membersection{wxGridSizer::GetHGap}\label{wxgridsizergethgap}
+
+\func{int}{GetHGap}{}
+
+Returns the horizontal gap (in pixels) between cells in the sizer.
+
+
+\membersection{wxGridSizer::GetRows}\label{wxgridsizergetrows}
+
+\func{int}{GetRows}{}
+
+Returns the number of rows in the sizer.
+
+
+\membersection{wxGridSizer::GetVGap}\label{wxgridsizergetvgap}
+
+\func{int}{GetVGap}{}
+
+Returns the vertical gap (in pixels) between the cells in the sizer.
+
+
+\membersection{wxGridSizer::SetCols}\label{wxgridsizersetcols}
+
+\func{void}{SetCols}{\param{int }{cols}}
+
+Sets the number of columns in the sizer.
+
+
+\membersection{wxGridSizer::SetHGap}\label{wxgridsizersethgap}
+
+\func{void}{SetHGap}{\param{int }{gap}}
+
+Sets the horizontal gap (in pixels) between cells in the sizer.
+
+
+\membersection{wxGridSizer::SetRows}\label{wxgridsizersetrows}
+
+\func{void}{SetRows}{\param{int }{rows}}
+
+Sets the number of rows in the sizer.
+
+
+\membersection{wxGridSizer::SetVGap}\label{wxgridsizersetvgap}
+
+\func{void}{SetVGap}{\param{int }{gap}}
+
+Sets the vertical gap (in pixels) between the cells in the sizer.
+
+
+
+
