X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/134198f1b773199b5506c302bf9510831d0319f5..c266eff98c5e44012647f54f38a1e29ecabd8759:/docs/latex/wx/auinotebook.tex?ds=sidebyside

diff --git a/docs/latex/wx/auinotebook.tex b/docs/latex/wx/auinotebook.tex
index 0a5809a624..fec32a0cc9 100644
--- a/docs/latex/wx/auinotebook.tex
+++ b/docs/latex/wx/auinotebook.tex
@@ -145,12 +145,6 @@ Returns the height of the tab control.
 
 Returns the currently selected page.
 
-\membersection{wxAuiNotebook::GetTabCtrlHeight}\label{wxauinotebookgettabctrlheight}
-
-\constfunc{int}{GetTabCtrlHeight}{\void}
-
-Returns the height of the tab control.
-
 \membersection{wxAuiNotebook::InsertPage}\label{wxauinotebookinsertpage}
 
 \func{bool}{InsertPage}{\param{size\_t }{page\_idx}, \param{wxWindow* }{page}, \param{const wxString\& }{caption}, \param{bool }{select = false}, \param{const wxBitmap\& }{bitmap = wxNullBitmap}}
