X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/12a44087e448071f9f108208a0a88e908d543d44..dd3c394ae4e6f6a0041b69e036d4fdf0a085fe39:/docs/latex/wx/minifram.tex

diff --git a/docs/latex/wx/minifram.tex b/docs/latex/wx/minifram.tex
index db8cd206b4..0acfcd6567 100644
--- a/docs/latex/wx/minifram.tex
+++ b/docs/latex/wx/minifram.tex
@@ -10,6 +10,10 @@ take up too much screen area.
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/minifram.h>
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
@@ -32,12 +36,14 @@ wxCAPTION.}
 for Windows, it is implicit in {\bf wxTHICK\_FRAME}).}
 \end{twocollist}
 
-See also \helpref{window styles overview}{windowstyles}.
+See also \helpref{window styles overview}{windowstyles}. Note that all the window styles
+above are ignored under GTK and the mini frame cannot be resized by the user.
 
 \wxheading{Remarks}
 
-This class has miniframe functionality under Windows and GTK+. On other platforms,
-it behaves like a normal frame.
+This class has miniframe functionality under Windows and GTK, i.e. the presence
+of mini frame will not be noted in the task bar and focus behaviour is different.
+On other platforms, it behaves like a normal frame.
 
 \wxheading{See also}
 
