X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1106d8654d8ce15be0e403fcea2050c1b257dbde..97c611f84745e193ac2b156a92dd127aaa9c7d51:/docs/latex/wx/fileostr.tex

diff --git a/docs/latex/wx/fileostr.tex b/docs/latex/wx/fileostr.tex
index 4e49bb3d17..c22c8b6114 100644
--- a/docs/latex/wx/fileostr.tex
+++ b/docs/latex/wx/fileostr.tex
@@ -58,5 +58,5 @@ Destructor.
 
 \constfunc{bool}{Ok}{\void}
 
-Returns TRUE if the stream is initialized and ready.
+Returns true if the stream is initialized and ready.
 
