X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1106d8654d8ce15be0e403fcea2050c1b257dbde..71aba8333cc915afff9e740c944f7fa7247abacb:/docs/latex/wx/fileistr.tex

diff --git a/docs/latex/wx/fileistr.tex b/docs/latex/wx/fileistr.tex
index b1b1cfb3e6..865320a1a6 100644
--- a/docs/latex/wx/fileistr.tex
+++ b/docs/latex/wx/fileistr.tex
@@ -54,5 +54,5 @@ Destructor.
 
 \constfunc{bool}{Ok}{\void}
 
-Returns TRUE if the stream is initialized and ready.
+Returns true if the stream is initialized and ready.
 
