X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/10ff9c616e00e4074dfdc2ac9e354605cc129c22..b3a029f0bbf8262cfe30914790802f88608ea618:/docs/latex/wx/tglbtn.tex

diff --git a/docs/latex/wx/tglbtn.tex b/docs/latex/wx/tglbtn.tex
index 0cd8afa5cf..88519f5fd9 100644
--- a/docs/latex/wx/tglbtn.tex
+++ b/docs/latex/wx/tglbtn.tex
@@ -15,7 +15,7 @@ wxToggleButton is a button that stays pressed when clicked by the user. In
 other words, it is similar to \helpref{wxCheckBox}{wxcheckbox} in
 functionality but looks like a \helpref{wxButton}{wxbutton}.
 
-Since wxWidgets version 2.9.0 this control emits a update UI event.
+Since wxWidgets version 2.9.0 this control emits an update UI event.
 
 You can see wxToggleButton in action in the sixth page of the
 \helpref{controls}{samplecontrols} sample.
@@ -51,7 +51,7 @@ See also \helpref{window styles overview}{windowstyles}.
 \wxheading{See also}
 
 \helpref{wxCheckBox}{wxcheckbox}, \helpref{wxButton}{wxbutton},
-\helpref{wxToggleBitmapButton}{wxtogglebitmapbutton}
+\helpref{wxBitmapToggleButton}{wxbitmaptogglebutton}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
