X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/103aab266479b319424b86ebe67f8e125a0c3b73..a5a0dd06b67fecd5e571bd9d4221101393d5561b:/docs/latex/wx/app.tex

diff --git a/docs/latex/wx/app.tex b/docs/latex/wx/app.tex
index 33c31801e7..88b7b8c40f 100644
--- a/docs/latex/wx/app.tex
+++ b/docs/latex/wx/app.tex
@@ -265,7 +265,7 @@ The default handler calls \helpref{wxWindow::Close}{wxwindowclose} with a TRUE a
 
 \wxheading{Remarks}
 
-Under X, OnEndSession is called in response to the 'die' event.
+Under X, OnEndSession is called in response to the `die' event.
 
 Under Windows, OnEndSession is called in response to the WM\_ENDSESSION message.
 
@@ -310,7 +310,7 @@ and vetoes the shutdown if Close returns FALSE. This will be sufficient for many
 
 \wxheading{Remarks}
 
-Under X, OnQueryEndSession is called in response to the 'save session' event.
+Under X, OnQueryEndSession is called in response to the `save session' event.
 
 Under Windows, OnQueryEndSession is called in response to the WM\_QUERYENDSESSION message.
 
