X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0f7e35594ff2cf328ea95b821b98a0fe3db10869..d9605e634b503651fd349a3d2c6781b2407ea273:/docs/latex/wx/animation.tex

diff --git a/docs/latex/wx/animation.tex b/docs/latex/wx/animation.tex
index ef29c589c5..ac408b1a06 100644
--- a/docs/latex/wx/animation.tex
+++ b/docs/latex/wx/animation.tex
@@ -65,7 +65,7 @@ See \helpref{reference-counted object destruction}{refcountdestruct} for more in
 
 \membersection{wxAnimation::GetDelay}\label{wxanimationgetdelay}
 
-\constfunc{int}{GetDelay}{\param{size\_t }{i}}
+\constfunc{int}{GetDelay}{\param{unsigned int }{i}}
 
 Returns the delay for the i-th frame in milliseconds.
 If {\tt -1} is returned the frame is to be displayed forever.
@@ -73,14 +73,14 @@ If {\tt -1} is returned the frame is to be displayed forever.
 
 \membersection{wxAnimation::GetFrameCount}\label{wxanimationgetframecount}
 
-\constfunc{size\_t}{GetFrameCount}{\void}
+\constfunc{unsigned int}{GetFrameCount}{\void}
 
 Returns the number of frames for this animation.
 
 
 \membersection{wxAnimation::GetFrame}\label{wxanimationgetframe}
 
-\constfunc{wxImage}{GetFrame}{\param{size\_t }{i}}
+\constfunc{wxImage}{GetFrame}{\param{unsigned int }{i}}
 
 Returns the i-th frame as a \helpref{wxImage}{wximage}.
 
