X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0f358732e44d89af3d83c4b77e19d0963afa7c7e..fe26d444bbc1d49dd8fe375ca736426f2309a1cd:/docs/latex/wx/tlog.tex

diff --git a/docs/latex/wx/tlog.tex b/docs/latex/wx/tlog.tex
index ae08edef53..8c031a488f 100644
--- a/docs/latex/wx/tlog.tex
+++ b/docs/latex/wx/tlog.tex
@@ -1,9 +1,7 @@
 \section{Log classes overview}\label{wxlogoverview}
 
-Classes: \helpref{wxLog}{wxlog}, \helpref{wxLogStderr}{wxlogstderr},
- \helpref{wxLogOstream}{wxlogostream}, \helpref{wxLogTextCtrl}{wxlogtextctrl},
- \helpref{wxLogWindow}{wxlogwindow}, \helpref{wxLogGui}{wxloggui},
- \helpref{wxLogNull}{wxlognull}
+Classes: \helpref{wxLog}{wxlog}, wxLogStderr,
+wxLogOstream, wxLogTextCtrl, wxLogWindow, wxLogGui, wxLogNull
 
 This is a general overview of logging classes provided by wxWindows. The word
 logging here has a broad sense, including all of the program output, not only
@@ -39,8 +37,8 @@ wxLogInfo}).
 bar of the active or specified (as the first argument) \helpref{wxFrame}{wxframe} if it has one.
 \item{\bf wxLogSysError} is mostly used by wxWindows itself, but might be
 handy for logging errors after system call (API function) failure. It logs the
-specified message text as well as the last system error code ({\it errno} or
-{\it ::GetLastError()} depending on the platform) and the corresponding error
+specified message text as well as the last system error
+code ({\it errno} or {\it ::GetLastError()} depending on the platform) and the corresponding error
 message. The second form of this function takes the error code explitly as the
 first argument.
 \item{\bf wxLogDebug} is {\bf the} right function for debug output. It only
@@ -54,7 +52,6 @@ version of this function takes a trace mask as the first argument which allows
 to further restrict the amount of messages generated.
 \end{itemize}
 
-% VZ: Julian, am I pushing too much here?
 The usage of these functions should be fairly straightforward, however it may
 be asked why not use the other logging facilities, such as C standard stdio
 functions or C++ streams. The short answer is that they're all very good
@@ -125,8 +122,8 @@ clear the log, close it completely or save all messages to file.
 \item{\bf wxLogNull} The last log class is quite particular: it doesn't do
 anything. The objects of this class may be instantiated to (temporarily)
 suppress output of {\it wxLogXXX()} functions. As an example, trying to open a
-non-existing file will usually provoke an error message, but if you for some
-reason it's unwanted, just use this construction:
+non-existing file will usually provoke an error message, but if for some
+reasons it's unwanted, just use this construction:
 
 {\small
 \begin{verbatim}
