X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0f353563055080c651d9929ab8880eefcf2b790e..eec47cc6c45a2d9a474cae9da897ebfdb0b7be21:/docs/latex/wx/conditn.tex

diff --git a/docs/latex/wx/conditn.tex b/docs/latex/wx/conditn.tex
index ff0cfb3407..c39e2c1689 100644
--- a/docs/latex/wx/conditn.tex
+++ b/docs/latex/wx/conditn.tex
@@ -145,7 +145,7 @@ not.
 \constfunc{bool}{IsOk}{\void}
 
 Returns {\tt true} if the object had been initialized successfully, {\tt false} 
-if an error occured.
+if an error occurred.
 
 \membersection{wxCondition::Signal}\label{wxconditionsignal}
 
@@ -181,7 +181,7 @@ Wait or the thread may sleep forever.
 
 \wxheading{Return value}
 
-Returns {\tt wxCOND\_NO\_ERROR} on success, another value if an error occured.
+Returns {\tt wxCOND\_NO\_ERROR} on success, another value if an error occurred.
 
 \wxheading{See also}
 
