X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0f353563055080c651d9929ab8880eefcf2b790e..403e664e5b3749060df8f526172a01e488cde6f3:/docs/latex/wx/mdi.tex?ds=sidebyside

diff --git a/docs/latex/wx/mdi.tex b/docs/latex/wx/mdi.tex
index 1fba122918..fc91d4f436 100644
--- a/docs/latex/wx/mdi.tex
+++ b/docs/latex/wx/mdi.tex
@@ -245,7 +245,7 @@ Child frames may be of class \helpref{wxMDIChildFrame}{wxmdichildframe} (contain
 within the parent frame) or \helpref{wxFrame}{wxframe} (shown as a top-level frame).
 
 An MDI parent frame always has a \helpref{wxMDIClientWindow}{wxmdiclientwindow} associated with it, which
-is the parent for MDI client frames.
+is the parent for MDI child frames.
 This client window may be resized to accommodate non-MDI windows, as seen in Microsoft Visual C++ (TM) and
 Microsoft Publisher (TM), where a documentation window is placed to one side of the workspace.
 
@@ -545,9 +545,12 @@ To remove the window completely, use the wxFRAME\_NO\_WINDOW\_MENU window style.
 
 \membersection{wxMDIParentFrame::Tile}\label{wxmdiparentframetile}
 
-\func{void}{Tile}{\void}
+\func{void}{Tile}{\param{wxOrientation}{ orient = wxHORIZONTAL}}
 
-Tiles the MDI child windows.
+Tiles the MDI child windows either horizontally or vertically depending on
+whether \arg{orient} is wxHORIZONTAL or wxVERTICAL.
+
+Currently only implemented for MSW, does nothing under the other platforms.
 
 \wxheading{See also}
 
