X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0f353563055080c651d9929ab8880eefcf2b790e..17bcb99892b5b424cc6888b1eecd34f5c37a16b4:/docs/latex/wx/mdi.tex

diff --git a/docs/latex/wx/mdi.tex b/docs/latex/wx/mdi.tex
index 1fba122918..f4ed04e303 100644
--- a/docs/latex/wx/mdi.tex
+++ b/docs/latex/wx/mdi.tex
@@ -545,9 +545,12 @@ To remove the window completely, use the wxFRAME\_NO\_WINDOW\_MENU window style.
 
 \membersection{wxMDIParentFrame::Tile}\label{wxmdiparentframetile}
 
-\func{void}{Tile}{\void}
+\func{void}{Tile}{\param{wxOrientation}{ orient = wxHORIZONTAL}}
 
-Tiles the MDI child windows.
+Tiles the MDI child windows either horizontally or vertically depending on
+whether \arg{orient} is wxHORIZONTAL or wxVERTICAL.
+
+Currently only implemented for MSW, does nothing under the other platforms.
 
 \wxheading{See also}
 
