X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0ea62c21057df47be5f3c12a2f2739af272f4819..b7d216951f5488dfe15ca33c098c39d37bf81813:/docs/latex/wx/array.tex?ds=sidebyside

diff --git a/docs/latex/wx/array.tex b/docs/latex/wx/array.tex
index 9c2596a60b..3e806ad938 100644
--- a/docs/latex/wx/array.tex
+++ b/docs/latex/wx/array.tex
@@ -531,7 +531,7 @@ The first version of the function is for wxArray and wxObjArray, the second is
 for wxSortedArray only.
 
 Searches the element in the array, starting from either beginning or the end
-depending on the value of {\it searchFromEnd} parameter. wxNOT\_FOUND is
+depending on the value of {\it searchFromEnd} parameter. {\tt wxNOT\_FOUND} is
 returned if the element is not found, otherwise the index of the element is
 returned.
 
@@ -633,7 +633,7 @@ elements of a wxArray (supposed to contain pointers).
 \func{void}{SetCount}{\param{size\_t }{count}, \param{T }{defval = T($0$)}}
 
 This function ensures that the number of array elements is at least 
-{\it count}. If the array has already {\it count} or mroe items, nothing is
+{\it count}. If the array has already {\it count} or more items, nothing is
 done. Otherwise, {\tt count - GetCount()} elements are added and initialized to
 the value {\it defval}.
 
