X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0e10e38d8b4405625c3687bdfe6cb315874d1d70..fc17828ab2cb3dc5dd22d5634ce4f6764e1373fc:/docs/latex/wx/gridedit.tex

diff --git a/docs/latex/wx/gridedit.tex b/docs/latex/wx/gridedit.tex
index 1aa6b7a9c8..e240603bd2 100644
--- a/docs/latex/wx/gridedit.tex
+++ b/docs/latex/wx/gridedit.tex
@@ -33,6 +33,25 @@ The editor for boolean data.
 Default constructor.
 
 
+\membersection{wxGridCellBoolEditor::IsTrueValue}\label{wxgridcellbooleditoristruevalue}
+
+\func{static bool}{IsTrueValue}{\param{const wxString\& }{value}}
+
+Returns \true if the given \arg{value} is equal to the string representation of
+the truth value we currently use (see 
+\helpref{UseStringValues}{wxgridcellbooleditorusestringvalues}).
+
+
+\membersection{wxGridCellBoolEditor::UseStringValues}\label{wxgridcellbooleditorusestringvalues}
+
+\func{static void}{UseStringValues}{\param{const wxString\& }{valueTrue = \_T("1")}, \param{const wxString\& }{valueFalse = \_T("")}}
+
+This method allows to customize the values returned by GetValue() method for
+the cell using this editor. By default, the default values of the arguments are
+used, i.e. \texttt{"1"} is returned if the cell is checked and an empty string
+otherwise, using this method allows to change this.
+
+
 \section{\class{wxGridCellChoiceEditor}}\label{wxgridcellchoiceeditor}
 
 The editor for string data allowing to choose from a list of strings.
@@ -61,7 +80,7 @@ The editor for string data allowing to choose from a list of strings.
 
 \docparam{count}{Number of strings from which the user can choose.}
 \docparam{choices}{An array of strings from which the user can choose.}
-\docparam{allowOthers}{If allowOthers if true, the user can type a string not in choices array.}
+\docparam{allowOthers}{If allowOthers is true, the user can type a string not in choices array.}
 
 
 \membersection{wxGridCellChoiceEditor::SetParameters}\label{wxgridcellchoiceeditorsetparameters}
