X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0e10e38d8b4405625c3687bdfe6cb315874d1d70..924b84ab9461c95cf5c5386d1091ae0f7a8e7ce7:/docs/latex/wx/flexsizr.tex

diff --git a/docs/latex/wx/flexsizr.tex b/docs/latex/wx/flexsizr.tex
index f19c7640cf..c161b8fafa 100644
--- a/docs/latex/wx/flexsizr.tex
+++ b/docs/latex/wx/flexsizr.tex
@@ -106,7 +106,7 @@ One of the following values:
 In this case equal sizing applies to minimum sizes of columns or
 rows (this is the default value).}
 \twocolitem{wxFLEX\_GROWMODE\_ALL}{Sizer equally stretches all columns or rows
-in the non flexible direction, whether they are growable or not in the flexbile
+in the non flexible direction, whether they are growable or not in the flexible
 direction.}
 \end{twocollist}
 
