X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0e10e38d8b4405625c3687bdfe6cb315874d1d70..78cd9c69eb3f4c158fe10ce49325d57ec05d1306:/docs/latex/wx/dialup.tex

diff --git a/docs/latex/wx/dialup.tex b/docs/latex/wx/dialup.tex
index 41ca690b6a..fd492047bf 100644
--- a/docs/latex/wx/dialup.tex
+++ b/docs/latex/wx/dialup.tex
@@ -6,7 +6,7 @@
 %% Created:     08.04.00
 %% RCS-ID:      $Id$
 %% Copyright:   (c) Vadim Zeitlin
-%% License:     wxWidgets license
+%% License:     wxWindows license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxDialUpManager}}\label{wxdialupmanager}
@@ -35,6 +35,10 @@ No base class
 
 <wx/dialup.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Event table macros}
 
 To be notified about the change in the network connection status, use these
