X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0e10e38d8b4405625c3687bdfe6cb315874d1d70..5814e8ba4e57839acd1eb7491ed392b07e382593:/docs/latex/wx/gridevt.tex

diff --git a/docs/latex/wx/gridevt.tex b/docs/latex/wx/gridevt.tex
index 3ef3b80d29..a58b498b54 100644
--- a/docs/latex/wx/gridevt.tex
+++ b/docs/latex/wx/gridevt.tex
@@ -143,8 +143,8 @@ Returns true if the Meta key was down at the time of the event.
 
 \func{bool}{Selecting}{\void}
 
-Returns true if the user deselected a cell, false if the user
-deselected a cell.
+Returns true if the user is selecting grid cells, false -- if
+deselecting.
 
 \membersection{wxGridEvent::ShiftDown}\label{wxgrideventshiftdown}
 
