X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0dbfd66d0b35352a0f60e7190b72815052b3d2d4..a84ece11fffdde5d1bbd254ba58ac3cee79c2e77:/docs/latex/wx/tipc.tex

diff --git a/docs/latex/wx/tipc.tex b/docs/latex/wx/tipc.tex
index d2c74699d7..6ad9d56b77 100644
--- a/docs/latex/wx/tipc.tex
+++ b/docs/latex/wx/tipc.tex
@@ -20,6 +20,16 @@ for programming popular Internet protocols.
 
 Further information on these classes will be available in due course.
 
+Notice that by including {\tt <wx/ipc.h>} you may define convnient synonyms for
+the IPC classes: {\tt wxServer} for either {\tt wxDDEServer} or 
+{\tt wxTCPServer} depending on whether DDE-based or socket-based implementation
+is used and the same thing for {\tt wxClient} and {\tt wxConnection}. By
+default, DDE implementation is used under Windows. If you want to use IPC
+between the different workstations you should define {\tt wxUSE\_DDE\_FOR\_IPC}
+as $0$ before including this header -- this will force using TCP/IP
+implementation even under Windows.
+
+
 wxWindows has a high-level protocol based on Windows DDE.
 There are two implementations of this DDE-like protocol:
 one using real DDE running on Windows only, and another using TCP/IP (sockets) that runs
