X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0da52ad172bee5a696ae332affbfbae011372e7b..751731864888f00e31e6dce1092ac28a1fac5358:/docs/latex/wx/checkbox.tex?ds=inline

diff --git a/docs/latex/wx/checkbox.tex b/docs/latex/wx/checkbox.tex
index b682c8fb73..57147c8184 100644
--- a/docs/latex/wx/checkbox.tex
+++ b/docs/latex/wx/checkbox.tex
@@ -1,8 +1,9 @@
 \section{\class{wxCheckBox}}\label{wxcheckbox}
 
-A checkbox is a labelled box which by default is either on (checkmark is visible)
-or off (no checkmark). Optionally (When the wxCHK_3STATE style flag is set) it can have
-a third state, called the mixed or undetermined state. Often this is used as a "Does Not Apply" state.
+A checkbox is a labelled box which by default is either on (checkmark is
+visible) or off (no checkmark). Optionally (When the wxCHK\_3STATE style flag
+is set) it can have a third state, called the mixed or undetermined state.
+Often this is used as a "Does Not Apply" state.
 
 \wxheading{Derived from}
 
@@ -19,7 +20,7 @@ a third state, called the mixed or undetermined state. Often this is used as a "
 
 \twocolwidtha{7cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{\windowstyle{wxCHK\_2STATE}}{Create a 2-state checkbox (This is the default).}
+\twocolitem{\windowstyle{wxCHK\_2STATE}}{Create a 2-state checkbox. This is the default.}
 \twocolitem{\windowstyle{wxCHK\_3STATE}}{Create a 3-state checkbox.}
 \twocolitem{\windowstyle{wxCHK\_ALLOW\_3RD\_STATE\_FOR\_USER}}{By default a user can't set a 3-state checkbox
 to the third state. It can only be done from code. Using this flags allows the user to set the checkbox to the third state by clicking. }
