X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0c131a5ad27be67aa6d859ee31024dac9885a753..93d3dbd4b36d33297169a0ab8dbbcdc45f4f663e:/docs/latex/wx/window.tex

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index f4e551cff2..a718081c98 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -1498,7 +1498,7 @@ This is just a wrapper for \helpref{ScrollLines}{wxwindowscrolllines}$(-1)$.
 
 \func{void}{Lower}{\void}
 
-Lowers the window to the bottom of the window hierarchy.
+Lowers the window to the bottom of the window hierarchy (z-order).
 
 \wxheading{See also}
 
@@ -2197,9 +2197,9 @@ remove the event handler.
 
 \func{void}{Raise}{\void}
 
-Raises the window to the top of the window hierarchy.
+Raises the window to the top of the window hierarchy (z-order).
 
-In current version of wxWidgets this works both for manage and child windows.
+In current version of wxWidgets this works both for managed and child windows.
 
 \wxheading{See also}
 
@@ -2455,16 +2455,21 @@ See also \helpref{wxAccessible}{wxaccessible}.
 \func{void}{SetAutoLayout}{\param{bool}{ autoLayout}}
 
 Determines whether the \helpref{wxWindow::Layout}{wxwindowlayout} function will
-be called automatically when the window is resized. It is called implicitly by
-\helpref{wxWindow::SetSizer}{wxwindowsetsizer} but if you use
+be called automatically when the window is resized. Please note that this only
+happens for the windows usually used to contain children, namely 
+\helpref{wxPanel}{wxpanel} and \helpref{wxTopLevelWindow}{wxtoplevelwindow} 
+(and the classes deriving from them).
+
+This method is called implicitly by 
+\helpref{wxWindow::SetSizer}{wxwindowsetsizer} but if you use 
 \helpref{wxWindow::SetConstraints}{wxwindowsetconstraints} you should call it
 manually or otherwise the window layout won't be correctly updated when its
 size changes.
 
 \wxheading{Parameters}
 
-\docparam{autoLayout}{Set this to {\tt true} if you wish the Layout function to be called
-from within wxWindow::OnSize functions.}
+\docparam{autoLayout}{Set this to \true if you wish the Layout function to be
+called automatically when the window is resized.}
 
 \wxheading{See also}
 
@@ -3126,7 +3131,7 @@ value should be used.}
 {\bf wxSIZE\_AUTO\_WIDTH}: a $wxDefaultCoord$ width value is taken to indicate
 a wxWidgets-supplied default width.\\
 {\bf wxSIZE\_AUTO\_HEIGHT}: a $wxDefaultCoord$ height value is taken to indicate
-a wxWidgets-supplied default width.\\
+a wxWidgets-supplied default height.\\
 {\bf wxSIZE\_AUTO}: $wxDefaultCoord$ size values are taken to indicate
 a wxWidgets-supplied default size.\\
 {\bf wxSIZE\_USE\_EXISTING}: existing dimensions should be used
