X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0bf9746652f717ba99ba0cdc7b980fda51e38e73..d8fcdf973f5cb5eedfe0c47c493b18df72a8d70c:/docs/latex/wx/boxsizer.tex

diff --git a/docs/latex/wx/boxsizer.tex b/docs/latex/wx/boxsizer.tex
index 08de2b2152..cb1338fee5 100644
--- a/docs/latex/wx/boxsizer.tex
+++ b/docs/latex/wx/boxsizer.tex
@@ -14,10 +14,17 @@ For more information, please see \helpref{Programming with wxBoxSizer}{boxsizerp
 
 <wx/sizer.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxSizer}{wxsizer}, \helpref{Sizer overview}{sizeroverview}
 
+
+\latexignore{\rtfignore{\wxheading{Members}}}
+
 \membersection{wxBoxSizer::wxBoxSizer}\label{wxboxsizerwxboxsizer}
 
 \func{}{wxBoxSizer}{\param{int }{orient}}
@@ -30,9 +37,9 @@ or wxHORIZONTAL for creating either a column sizer or a row sizer.
 \func{void}{RecalcSizes}{\void}
 
 Implements the calculation of a box sizer's dimensions and then sets
-the size of its its children (calling \helpref{wxWindow::SetSize}{wxwindowsetsize} 
+the size of its children (calling \helpref{wxWindow::SetSize}{wxwindowsetsize} 
 if the child is a window). It is used internally only and must not be called
-by the user. Documented for information.
+by the user (call Layout() if you want to resize). Documented for information.
 
 \membersection{wxBoxSizer::CalcMin}\label{wxboxsizercalcmin}
 
