X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0bf9746652f717ba99ba0cdc7b980fda51e38e73..c670c85582ca995105f14a6c62b54c580582f624:/docs/latex/wx/boxsizer.tex

diff --git a/docs/latex/wx/boxsizer.tex b/docs/latex/wx/boxsizer.tex
index 08de2b2152..279896593d 100644
--- a/docs/latex/wx/boxsizer.tex
+++ b/docs/latex/wx/boxsizer.tex
@@ -30,7 +30,7 @@ or wxHORIZONTAL for creating either a column sizer or a row sizer.
 \func{void}{RecalcSizes}{\void}
 
 Implements the calculation of a box sizer's dimensions and then sets
-the size of its its children (calling \helpref{wxWindow::SetSize}{wxwindowsetsize} 
+the size of its children (calling \helpref{wxWindow::SetSize}{wxwindowsetsize} 
 if the child is a window). It is used internally only and must not be called
 by the user. Documented for information.
 
