X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/0bf9746652f717ba99ba0cdc7b980fda51e38e73..81c882b613b5d99ddb1e5ab69fcd7ebccc287025:/docs/latex/wx/boxsizer.tex

diff --git a/docs/latex/wx/boxsizer.tex b/docs/latex/wx/boxsizer.tex
index 08de2b2152..4f75fb61a0 100644
--- a/docs/latex/wx/boxsizer.tex
+++ b/docs/latex/wx/boxsizer.tex
@@ -30,9 +30,9 @@ or wxHORIZONTAL for creating either a column sizer or a row sizer.
 \func{void}{RecalcSizes}{\void}
 
 Implements the calculation of a box sizer's dimensions and then sets
-the size of its its children (calling \helpref{wxWindow::SetSize}{wxwindowsetsize} 
+the size of its children (calling \helpref{wxWindow::SetSize}{wxwindowsetsize} 
 if the child is a window). It is used internally only and must not be called
-by the user. Documented for information.
+by the user (call Layout() if you want to resize). Documented for information.
 
 \membersection{wxBoxSizer::CalcMin}\label{wxboxsizercalcmin}
 
